KERMIT-8

K08MIT.PAL is Kermit for the DEC PDP-8 with OS8 or RTS8 written in the PAL-8
assember by Jerry Sands and Randy Hippe of:

	Bureau of Engraving, Inc.
	3311 Broadway N.E.
	Minneapolis, MN  55413
	Phone 612-623-0900 x218

Implements the following commands:

	1.	CONNECT
	2.	BYE
	3.	EXIT
	4.	SEND
	5.	GET
	6.	RECEIVE

Supports wildcarding for "SEND" only.  (Sorry, this is all the documentation.)
